From 0c8fa3a2a270747f3dbb54fe8792f3f0aec997e3 Mon Sep 17 00:00:00 2001
From: Ryan Schanzenbacher <ryan@rschanz.org>
Date: Mon, 3 Aug 2026 01:22:44 -0400
Subject: Initial commit: combined darwin + guix-linux home-manager flake

Supersedes nix-dotfiles (darwin) and guix-dotfiles' ad-hoc
nix-home-manager flake (linux). See README.md/MIGRATION.md.
---
 .../lib/components/icons/library/thermostat.jsx                  | 9 +++++++++
 1 file changed, 9 insertions(+)
 create mode 100755 users/ryan/modules/simple-bar/simple-bar-source/lib/components/icons/library/thermostat.jsx

(limited to 'users/ryan/modules/simple-bar/simple-bar-source/lib/components/icons/library/thermostat.jsx')

diff --git a/users/ryan/modules/simple-bar/simple-bar-source/lib/components/icons/library/thermostat.jsx b/users/ryan/modules/simple-bar/simple-bar-source/lib/components/icons/library/thermostat.jsx
new file mode 100755
index 0000000..77a448a
--- /dev/null
+++ b/users/ryan/modules/simple-bar/simple-bar-source/lib/components/icons/library/thermostat.jsx
@@ -0,0 +1,9 @@
+import Icon from "../icon.jsx";
+
+export default function Thermostat(props) {
+  return (
+    <Icon {...props}>
+      <path d="M15 13V5c0-1.66-1.34-3-3-3S9 3.34 9 5v8c-1.21.91-2 2.37-2 4 0 2.76 2.24 5 5 5s5-2.24 5-5c0-1.63-.79-3.09-2-4zm-4-8c0-.55.45-1 1-1s1 .45 1 1h-1v1h1v2h-1v1h1v2h-2V5z" />
+    </Icon>
+  );
+}
-- 
cgit v1.3.1

